<template>
  <v-container class="d-flex">
    <v-row>
      <v-col cols="3">
        <valve-control
          valve-name="QM01"
          node-id="ns=4;s=GVL_SCADA.stPolarisHMIInterface.stAtmoTemp.stBeforePCValve"
        />
      </v-col>
      <v-col cols="3">
        <valve-control
          valve-name="QM02"
          node-id="ns=4;s=GVL_SCADA.stPolarisHMIInterface.stAtmoTemp.stBeforePfmValveHMI"
        />
      </v-col>
      <v-col cols="3">
        <valve-control
          valve-name="QM09"
          node-id="ns=4;s=GVL_SCADA.stPolarisHMIInterface.stAtmoTemp.stAfterPfmValveHMI"
        />
      </v-col>
      <v-col cols="3">
        <valve-control
          valve-name="QM40"
          node-id="ns=4;s=GVL_SCADA.stPolarisHMIInterface.stAtmoTemp.stInertAndPurgeOutletValve"
        />
      </v-col>
    </v-row>
  </v-container>
</template>


<script>
  import ValveControl from '@/components/BaseComponents/ValveControl.vue'

  export default {
    name: 'AtmoManualView',
    components: {
      ValveControl,
    }
  }
</script>
